ALTER TABLE `negative`.`model`
    ADD COLUMN `model_type` varchar(255) NULL COMMENT '模型类型',
    ADD COLUMN `handle_depart_type` varchar(255) NULL COMMENT '通知单位' AFTER `model_type`,
    ADD COLUMN `request_reply` tinyint NULL DEFAULT 1 COMMENT '是否要求回复' AFTER `model_type`,
    ADD COLUMN `reply_limit` int NULL COMMENT '通知回复时限' AFTER `request_reply`;